<script setup lang="ts">
// Apply dark theme by default on initial load; settings page can toggle it
useHead({
  htmlAttrs: { class: 'dark' },
})
</script>

<template>
  <NuxtLayout>
    <NuxtPage />
  </NuxtLayout>
</template>
